MCALL COMMAND LINE SYNTAX:

	MCALL [-<switches>] [<filename>]

	where
		[....] -- denotes optional arguments

		<switches> = {A,O;E,F,H;B,C,M,N,P,T,X;#;!;@;.<baud>}
	where
		(A)nswer mode, (O)riginate mode;
		(E)choplex, (F)ull duplex, (H)alf duplex;
		(B)reak/return, mcall-(C), (M)odem,
		(N)ull, (P)ip, mcall-(T), (X)-on/x-off;
		(#)control character screen on;
		(!)logging on;
		(@)bypass phone.num display
		(.)set baud rate to <baud>
	where
		<baud> = {110,300,1200,2400,4800,9600}

MCALL INVOCATION EXAMPLES:

	MCALL FILENAME.TYP		;CONVENTIONAL INVOCATION

	MCALL -O 			;DIRECT TO (O)RIGINATE
					;DUPLEX = FULL (by default)
					;PROTOCOL = X-ON/X-OFF (by default)
					;FILENAME = DEFAULT.FIL (by default)
					;BAUDRATE = 300 (by default)

	MCALL -A B:FOO.FIL		;DIRECT TO (A)NSWER MODE
					;DUPLEX = ECHOPLEX (by default)
					;PROTOCOL = X-ON/X-OFF (by default)
					;FILENAME = B:FOO.FIL
					;BAUDRATE = 300 (by default)

	MCALL -OC!.1200			;DIRECT TO (O)RIGINATE
					;PROTOCOL = (C), i.e., MCALL-C
					;PRINTER LOGGING (!) ON
					;BAUDRATE = 1200

	MCALL -OEN			;DIRETC TO (O)RIGINATE
					;DUPLEX = (E)COHPLEX
					;PROTOCOL = (N)ULL

	MCALL -!OHB JUNK.FIL		;TURN LOG ON (!) AND GO DIRECT
					;TO (O)RIGINATE, DUX = (H)ALF
					;PROTOCOL = (B)REAK/CONTINUE

	MCALL -@OT.110			;BYPASS PHONE.NUM DISPLAY AND GO
					;DIRECT TO (O)RIGINATE, i.e., CALL
					;HAS ALREADY BEEN PLACED.
					;protocol = (T), i.e., MCALL-T
					;BAUDRATE = 110

NOTE:

  o  The values identified as (by default) can be modified by CONFIG.COM

  o  The <baud> set is different on the various supported systems
L (by default)
					;PROTOCOL = X-ON/X-OFF (by default)
					;FILENAME = DEFAULT.FIL (by default)
					;BAUDRATE = 300 (b