AMCALL COMMAND LINE SYNTAX:

	AMCALL [-<switches>] [<filename>]

	where
		[....] -- denotes optional arguments

		<switches> = {A,O;E,F,H;B,C,M,N,T,W,X;R;#;!;@;.<baud>}
	where
		(A)nswer mode, (O)riginate mode;
		(E)choplex, (F)ull duplex, (H)alf duplex;
		(B)reak/return, mcall-(C), (M)odem, (N)ull,
		mcall-(T), (W)estern union twx, (X)-on/x-off;
		(R)eceive a file;
		(#)control character screen on;
		(!)logging on;
		(@)bypass auto-answer/auto-dial
		(.)set baud rate to <baud>
	where
		<baud> = {110,150,300,450,500,600} or {300,1200}

AMCALL INVOCATION EXAMPLES:

	AMCALL FILENAME.TYP		;CONVENTIONAL INVOCATION

	AMCALL -O 			;DIRECT TO (O)RIGINATE
					;DUPLEX = FULL (by default)
					;PROTOCOL = X-ON/X-OFF (by default)
					;FILENAME = DEFAULT.FIL (by default)
					;BAUDRATE = 300 (by default)

	AMCALL -A B:FOO.FIL		;DIRECT TO (A)NSWER MODE
					;DUPLEX = ECHOPLEX (by default)
					;PROTOCOL = X-ON/X-OFF (by default)
					;FILENAME = B:FOO.FIL
					;BAUDRATE = 300 (by default)

	AMCALL -OC!.600			;DIRECT TO (O)RIGINATE
					;PROTOCOL = (C), i.e., MCALL-C
					;PRINTER LOGGING (!) ON
					;BAUDRATE = 600

	AMCALL -!OHB JUNK.FIL		;TURN LOG ON (!) AND GO DIRECT
					;TO (O)RIGINATE, DUX = (H)ALF
					;PROTOCOL = (B)REAK/RETURN

	AMCALL -OWR.1200 TIMETRAN.ITT	;DIRECT TO (O)RIGINATE
					;PROTOCOL = (W)ESTERN UNION TWX
					;  DUPLEX = HALF (RESULT OF (W))
					;  NEW-LINE MODE (RESULT OF (W))
					;(R)ECEIVE A FILE
					;BAUDRATE = 1200

	AMCALL -@O.450			;BYPASS AUTO_DIAL AND GO DIRECT
					;TO (O)RIGINATE, i.e., CALL
					;HAS ALREADY BEEN PLACED.
					;BAUDRATE = 450

	AMCALL -@A			;BYPASS AUTO_ANS AND GO DIRECT
					;TO (A)NSWER, i.e., CALL HAS
					;ALREADY BEEN PLACED.

NOTE:  The values identified as (by default) can be modified by CONFIG-A.COM
